IsoValue 47.3684 51.3158 53.9474 56.5789 59.2105 61.8421 64.4737 67.1053 69.7368 72.3684 75 77.6316 80.2632 82.8947 85.5263 88.1579 90.7895 93.4211 96.0526 102.632

Champ de temp sans resistances