IsoValue -10.9067 5.45335 16.36 27.2667 38.1734 49.0801 59.9868 70.8935 81.8002 92.7069 103.614 114.52 125.427 136.334 147.24 158.147 169.054 179.96 190.867 218.134

Champ associe a la resistance 6