IsoValue 28.5311 60.7345 82.2034 103.672 125.141 146.61 168.079 189.548 211.017 232.486 253.955 275.424 296.892 318.361 339.83 361.299 382.768 404.237 425.706 479.378

Champ superpose avec resistance 1 +...+resistance 6